From 92d73546a7ff266ca5d6ddfbbb64c7790974c253 Mon Sep 17 00:00:00 2001
From: jaseg <git@jaseg.de>
Date: Fri, 16 Sep 2022 18:19:34 +0200
Subject: Fix build

---
 paper/safety-reset-paper.tex | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'paper/safety-reset-paper.tex')

diff --git a/paper/safety-reset-paper.tex b/paper/safety-reset-paper.tex
index e79f7b3..f07a15e 100644
--- a/paper/safety-reset-paper.tex
+++ b/paper/safety-reset-paper.tex
@@ -377,6 +377,10 @@ In this instance, market forces do not align with the interest of the public at
 especially in code implementing complex network protocols such as TLS~\cite{georgiev01}, which may even be mandated by
 national standards in some devices such as smart electricity meters.
 
+\subsection{Reliably resetting an IoT or Smart Grid device}
+
+
+
 \subsection{Oscillations in the electrical grid}
 
 Common to the attacks on the electrical grid proposed in the papers discussed above is their approach of overloading
@@ -859,3 +863,5 @@ Source code and EDA designs are available at the public repository listed at the
     \center{This is version \texttt{\input{version.tex}\unskip} of this paper, generated on \today.}
     \center{Source files and associated data for this work can be found in the git repository at the following URL:
     \url{https://git.jaseg.de/safety-reset.git} }
+
+\end{document}
-- 
cgit 

