From 7eb5a8652eee2271de897c79f4f0c14eea2d1264 Mon Sep 17 00:00:00 2001
From: jaseg <git-bigdata-wsl-arch@jaseg.de>
Date: Sun, 5 Jul 2020 16:18:49 +0200
Subject: ma: work on final build

---
 ma/safety_reset.tex | 67 ++++++++++++++++++++++++++++-------------------------
 1 file changed, 36 insertions(+), 31 deletions(-)

(limited to 'ma/safety_reset.tex')

diff --git a/ma/safety_reset.tex b/ma/safety_reset.tex
index 1c1576c..38bc54a 100644
--- a/ma/safety_reset.tex
+++ b/ma/safety_reset.tex
@@ -2724,12 +2724,6 @@ public repository listed on the second page of this document.
 \newpage
 
 \appendix
-%\chapter{Transcripts of Jupyter notebooks used in this thesis}
-
-%\includenotebook{Grid frequency estimation}{grid_freq_estimation}
-%\includenotebook{Grid frequency estimation validation against ROCOF test suite}{freq_meas_validation_rocof_testsuite}
-%\includenotebook{Frequency sensor clock stability analysis}{gps_clock_jitter_analysis}
-%\includenotebook{DSSS modulation experiments}{dsss_experiments-ber}
 
 \chapter{Frequency sensor schematics}
 \label{sec-app-freq-sens-schematics}
@@ -2743,36 +2737,47 @@ public repository listed on the second page of this document.
 \includepdf[fitpaper,landscape,pagecommand={\thispagestyle{fancy}}]{resources/platform-export-pg3.pdf}
 \fancyfoot[C]{\thepage}
 
-%\chapter{Firmware source code excerpts}
-%\section{DMA-backed ADC capture (adc.c)}
-%\inputminted[fontsize=\footnotesize,linenos,firstline=18,lastline=115,breaklines]{C}{../gm_platform/fw/adc.c}
-%
-%\section{Frequency sensor packetized serial interface}
-%\subsection{serial.c}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../gm_platform/fw/serial.c}
-%\subsection{packet\_interface.c}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../gm_platform/fw/packet_interface.c}
-%\subsection{cobs.c}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../gm_platform/fw/cobs.c}
-%\subsection{Host data logging utility (tw\_test.py)}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{python}{../gm_platform/fw/tw_test.py}
-%
-%\section{Frequency estimation (freq\_meas.c)}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/freq_meas.c}
-%\section{DSSS demodulation (dsss\_demod.c)}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/dsss_demod.c}
-%\section{Cryptographic protocol handling}
-%\subsection{protocol.c}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/protocol.c}
-%\subsection{crypto.c}
-%\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/crypto.c}
-
-
 \chapter{Demonstrator firmware symbol size map}
 \emph{Please find this appendix enclosed in the pouch on the inside of the back cover.}
 \label{symbol_size_chart}
 \includepdf[fitpaper]{resources/safetyreset-symbol-sizes.pdf}
 
+\ifdefined\includenotebooks
+\chapter{Transcripts of Jupyter notebooks used in this thesis}
+
+\includenotebook{Grid frequency estimation}{grid_freq_estimation}
+\includenotebook{Grid frequency estimation validation against ROCOF test suite}{freq_meas_validation_rocof_testsuite}
+\includenotebook{Frequency sensor clock stability analysis}{gps_clock_jitter_analysis}
+\includenotebook{DSSS modulation experiments}{dsss_experiments-ber}
+\fi
+
+\ifdefined\includefirmwaresources
+\chapter{Firmware source code excerpts}
+\section{DMA-backed ADC capture (adc.c)}
+\inputminted[fontsize=\footnotesize,linenos,firstline=18,lastline=115,breaklines]{C}{../gm_platform/fw/adc.c}
+
+\section{Frequency sensor packetized serial interface}
+\subsection{serial.c}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../gm_platform/fw/serial.c}
+\subsection{packet\_interface.c}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../gm_platform/fw/packet_interface.c}
+\subsection{cobs.c}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../gm_platform/fw/cobs.c}
+\subsection{Host data logging utility (tw\_test.py)}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{python}{../gm_platform/fw/tw_test.py}
+
+\section{Frequency estimation (freq\_meas.c)}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/freq_meas.c}
+\section{DSSS demodulation (dsss\_demod.c)}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/dsss_demod.c}
+\section{Cryptographic protocol handling}
+\subsection{protocol.c}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/protocol.c}
+\subsection{crypto.c}
+\inputminted[fontsize=\footnotesize,linenos,breaklines]{C}{../controller/fw/src/crypto.c}
+\fi
+
+
 % TODO
 %\chapter{Economic viability of countermeasures}
 %\section{Attack cost}
-- 
cgit 

